\documentclass[a4paper,fleqn]{article}
\usepackage{iemss}
\usepackage{times}
\usepackage[dvips]{graphicx}
\usepackage{natbib}
\bibpunct{[}{]}{;}{a}{,}{,~}

\title{Title: 18 pt Times New Roman Bold, Upper and Lower Case\thanks{
Thanks go here.}}

%Authors Names and Affiliations:  Two spaces below the title, 10 pt
%Times Roman, Upper and Lower Case, underline author presenting
%paper and  provide his/her email address

\author{\underline{A. Author}
\address[A1]{A affiliation\\
GPO Box 123\\
Somewhere, SomeCountry}, B. Author\address[B1]{B affiliation,\\
GPO Box 987\\
Somewhere else, SomeCountry}, C. Author\addressmark[A1] and D.
Author\addressmark[B1]}
\begin{document}
\begin{abstract}
The abstract should be self-contained and explicit, setting out
the ground covered and the principal conclusions reached and
should be one paragraph only.  The suggested length is 300 words.
The abstract must start 2 cm below Authors Affiliations and span
the full width of the page.  The format is 10 pt Times Roman,
fully justified.
\end{abstract}
\begin{keyword}
Start keywords one space below the abstract and provide 3 to 5
keywords separated by semicolons.
\end{keyword}

\maketitle

\section{Body of Paper}

Main headings are Caps, Bold.  Text must flow in two columns.  All
text is 10 pt Times Roman, fully justified. Leave 2 spaces above
and one space below headings and sub-headings


\subsection{Introduction}

Secondary headings are Upper and Lower Case, Bold.

The main purpose of an introduction is to enable the paper to be
understood without undue reference to other sources.  It should
therefore have sufficient background material for this purpose.
Generally, highly specialised papers will not need an extensive
introduction as interested readers may be expected to be familiar
with current literature on the subject.  On the other hand, when a
paper is likely to interest people working in fields outside the
immediate area of the paper, the introduction should contain
background material which could otherwise be scattered throughout
the literature.


\subsection{Equations}
Equations should be numbered consecutively as they appear in the
text with Arabic numerals and should be referred to by their
numbers only, e.g. (3).  Equations must be typed not hand printed.
About 5 mm should be left clear above and below each equation.


\subsection{Figures and Photographs}
Figures must be of high quality and in black and white. Figure
numbers and captions appear at the foot of the figures. If
necessary, figures and captions may straddle both columns. Figures
should be numbered consecutively with Arabic numerals, in the
order in which reference is made to them in the text, e.g. Figure
1, Figure 2, etc. Figure Captions. 10 pt Times Roman, centred.

Photographs should only be used if essential to the clarity of the
paper.  If used they must be black and white with clear contrast
and highly glossed.

\subsection{Conclusions and Recommendations}

The real value of a paper is reflected in the nature, soundness
and clarity of the conclusions, so particular care should be taken
with this section.

\section{NOTATION AND UNITS}

If the paper makes extensive use of symbols or other special
nomenclature they should be listed and defined under this heading.
Otherwise, all symbols are to be defined when first used.  All
units are to be SI (metric).


\section{CRITERIA FOR ACCEPTANCE}

\subsection{Length and Other Details}

Full papers must not exceed six A4 camera-ready pages.  This
includes all diagrams and figures. All papers will be
independently refereed.

\subsection{Permission to Publish}
Unless informed by the author to the contrary, the Society will
assume that a paper submitted has not been published or offered
elsewhere and is not the property of any other person or body.

It is the author's responsibility to obtain any necessary
permission from his/her organisation or from any other person or
body for the publication of a paper or any material in it; such
permission need not be mentioned in the acknowledgments.

\section{PRESENTATION OF PAPER AT THE CONGRESS}

\subsection{Slides and Transparencies}
Projected diagrams are intended to assist the oral presentation of
a paper and should be prepared specifically for this purpose. They
should allow only essential information but this should be
technically correct.

Line thickness should show clear contrasts.  As a general rule,
the original drawing should be clearly legible when viewed from a
distance of six times its longest side. Graphs and curves are
projected primarily to show tendencies and relationships rather
than to determine numerical values.  Grid lines should therefore
be minimised or replaced by simple scales running along the axes.
The curves themselves should be the prominent feature.


\subsection{Sizes and Mounting of Slides}
Only standard 35 mm slides will be projected.

\subsection{Transparencies}
Transparencies for overhead projection should be no larger than
200 mm x 250 mm.

\subsection{Powerpoint Presentation}
Audiovisual equipment for electronic projection will be available.
Authors who intend to use this option for their presentations are
requested to inform the Convener by 31 October 2001.

\section{REGISTRATION}

At least one of the authors should be registered for final
acceptance of the paper and its inclusion in the Congress
Proceedings.

\section{ENQUIRIES AND CORRESPONDENCE}
All enquires concerning papers, at any stage of the process of
preparation, review and publication should be addressed to:

Dr Fred Ghassemi MODSIM 2001 Congress Secretariat C/- Centre for
Resource and Environmental Studies The Australian National
University, Canberra ACT 0200 AUSTRALIA

Phone: +61 2 6125 0653

Fax:     +61 2 6125  0757

Email: fredg@cres.anu.edu.au

\section*{Acknowledgments}
Any particular assistance out of the ordinary may be acknowledged.
It is not necessary from the organisers' point of view to record
the permission of the author's organisation to publish the paper
or the information contained therein.

\subsection{References}

\subsubsection{Style}
(Note the form of second level sub-headings.)  References should
include (in the following order): Author Name(s), Initials, Title
of article with first letter uppercase, full Journal name in
Italics, Volume (Number), page range, date.  The page range must
be hyphenated.  An example of a reference in a conference paper is
given below.

\subsubsection{Order}

The references must be listed in alphabetical order of author's
names and increasing dates of publication, with the addition of an
'a' or 'b' to the date, where necessary.  In the text reference is
made to writing the surname of the author, followed by the date of
publication in square brackets, e.g. "it was shown by
\citet{hanke:dfwudc} that ...". Where more than two authors are
involved, the reference in the text should be of the form: "it was
shown by \citet{churchman:itor}".

It was shown by \citet{berry:teomowcihbsi} that...

\subsection{Appendices}
If more than one, appendices should be lettered A, B, etc., e.g.
Appendix A.


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\bibliographystyle{iemss}
\bibliography{iemss}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\end{document}

